From b592e950107b38cf66f7cece962a5f29a020f824 Mon Sep 17 00:00:00 2001
From: gafan
Date: Wed, 31 Mar 2004 18:37:14 +0000
Subject: ajout du pwm à la documentation (testim =fichier temporaire)

---
 2004/n/fpga/doc/dcd/rapport.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to '2004/n/fpga/doc/dcd/rapport.tex')

diff --git a/2004/n/fpga/doc/dcd/rapport.tex b/2004/n/fpga/doc/dcd/rapport.tex
index 1b065a2..51bcd32 100644
--- a/2004/n/fpga/doc/dcd/rapport.tex
+++ b/2004/n/fpga/doc/dcd/rapport.tex
@@ -98,7 +98,7 @@ Cf sch
 \pagebreak
 
 \section{Les sorties PWM}
-%\input{./pwm/pwm.tex}
+\input{./pwm/pwm.tex}
 \pagebreak
 
 \section{Le bloc de gestion de la cam�ra}
-- 
cgit v1.2.3

